SDEF
path models/hanglight
scale 1.0
hanglight1_base.sbm
hanglight1_base.tga
hanglight1red_base.tga

hanglight1_idle.SAM

id 10 group light

//
// The initialization section
//
!init:
server classname object
server flags +darken +die_shatter
group light +fullbright

//
// The main section
//
!main:
//
// The SINED declaration section
//
/*SINED items_hanglite1_on (.3 1 .3) (0 0 0) (0 0 0) NOT_SOLID NOT_DAMAGABLE 
Hanging light fixture
Wire with Light Bulb (White & Red)
*/
